Chapter 30_{Chapter 30 The Virtual Run Utility (VBGEXE)}

Automatically Running Jobs Under VBGEXE . . . . . . . . . . . . . . . . . . . . . . . . . . . 30�2 Running Background, Foreground, or System Jobs . . . . . . . . . . . . . . . . . . . . . . . 30�3 How VBGEXE Allocates and Uses Low Memory . . . . . . . . . . . . . . . . . . . . . . . . . 30�4 Running Separated I-and-D Space Programs . . . . . . . . . . . . . . . . . . . . . . . . . . . . 30�5 Restrictions for Using VBGEXE . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 30�6

VBGEXE

VBGEXE